ηΔ 1.5 - 1- 0.5- 0 0.5 1 1.5

〉 {2} 2v〈_1〉_3q〈 -〉_3q{2}_2v〈

0.1 - 0.08 - 0.06 - 0.04 - 0.02 - 0 0.02

0.04

0.06

0.08

0.1^{3-}10× pos (reflected) neg (reflected) pos neg

20-60% Pb-Pb = 2.76 TeV NNs

ALICE c < 5.0 GeV/ Tp 0.2 <